Copyright: Copyright © 2002 Autodesk, Inc. [v.u18.0.01] AcSignExt.HLP   Monday, September 23, 2002 16:30:28


Displays any comments about the digital signature that is attached to the current file.


Displays a Valid Signature icon if a digital signature is valid, and an Invalid Signature icon if the digital signature is not valid.


Displays the date and time the digital signature was attached to the current file. The date and time are based on the time service used when the signature was attached.


Displays the name of the organization or individual who attached a digital signature to the current file.


Displays the file status (This File Has Not Been Saved, This File Has Not Been Modified Since Signed, Invalid: File Has Been Modified, DXF Files Do Not Support Signatures, or Problem with Certification Path).


Contains detailed information about the digital signature. You can choose an option from this list to display that information in the Values box.


Displays the name of the organization or individual who attached a digital signature to the current file.


Displays any comments about the digital signature that is attached to the current file.


Displays the date and time that the digital signature was attached to the current file. The date and time are based on the time service used when the signature was attached.


Contains detailed information about the digital signature. You can choose an option from this list to display that information in the Values box.


Displays the name of the organization or individual who attached a digital signature to the current file.


Displays the time service used to add the time stamp to the current file.


Displays the information based on the item you select in the Other Fields list.


Displays the time service used to add the time stamp to the current file.


Displays the status of the digital signature (The Digital Signature is Valid, Invalid Digital Signature, No Digital Signature, or Digital ID Error).


Displays values associated with a digital signature.